Lg054 Channel One - Estimated Error

Time

0 100 200 300 400

-0.004 0.0 0.002 0.006

Lg054 Channel Two - Estimated Error

Time

0 100 200 300 400

-0.006 -0.002 0.002 0.006

Lg054 Channel Three - Estimated Error

Time

0 100 200 300 400

-0.005 0.0 0.005 0.010 0.015

Lg054 Channel Four - Estimated Error

Time

0 100 200 300 400

-0.015 -0.005 0.005

Lg054 Channel Five - Estimated Error

Time

0 100 200 300 400

-0.010 -0.005 0.0 0.005 0.010