frequency spectrum

0.0 0.1 0.2 0.3 0.4 0.5

-10 0 10 20

Series: x[1, ] Smoothed Periodogram

bandwidth= 0.00406575 , 95% C.I. is ( -3.68829 , 6.45504 )dB

frequency spectrum

0.0 0.1 0.2 0.3 0.4 0.5

-10 0 10 20

Series: x[2, ] Smoothed Periodogram

bandwidth= 0.00406575 , 95% C.I. is ( -3.68829 , 6.45504 )dB

frequency spectrum

0.0 0.1 0.2 0.3 0.4 0.5

-10 0 10 20

Series: x[3, ] Smoothed Periodogram

bandwidth= 0.00406575 , 95% C.I. is ( -3.68829 , 6.45504 )dB

frequency spectrum

0.0 0.1 0.2 0.3 0.4 0.5

-10 0 10 20

Series: x[4, ] Smoothed Periodogram

bandwidth= 0.00406575 , 95% C.I. is ( -3.68829 , 6.45504 )dB

frequency spectrum

0.0 0.1 0.2 0.3 0.4 0.5

-20 -10 0 10 20

Series: x[5, ] Smoothed Periodogram

bandwidth= 0.00406575 , 95% C.I. is ( -3.68829 , 6.45504 )dB