0.6 1.0 1.4

0 50 100 150 200 250

a(4)

a(7) 1:1000

0.6 1.0 1.4

0 20 40 60 80 100 120 140 a(7) 1001:2000

0.6 1.0 1.4

0 50 100 150 200 a(7) 2001:3000

0.6 1.0 1.4

0 50 100 150 a(7) 3001:4000

0.6 1.0 1.4

0 50 100 150 a(8) 4001:5000

0.0 0.4 0.8

0 50 100 150 200 250 300

a(8)

a(7) 1:1000

0.0 0.4 0.8

0 50 100 150 a(7) 1001:2000

0.0 0.4 0.8

0 50 100 150 200 250 a(7) 2001:3000

0.0 0.4 0.8

0 50 100 150 a(7) 3001:4000

0.0 0.4 0.8

0 50 100 150 a(8) 4001:5000

0.0 0.4 0.8

0 50 100 150

a(13)

a(14) 1:1000

0.0 0.4 0.8

0 50 100 150 200 250 a(14) 1001:2000

0.0 0.4 0.8

0 50 100 150 a(14) 2001:3000

0.0 0.4 0.8

0 50 100 150 200 a(14) 3001:4000

0.0 0.4 0.8

0 50 100 150 a(14) 4001:5000

0.0 0.4 0.8

0 50 100 150 200

a(18)

a(19) 1:1000

0.0 0.4 0.8

0 50 100 150 a(19) 1001:2000

0.0 0.4 0.8

0 50 100 150 a(19) 2001:3000

0.0 0.4 0.8

0 50 100 150 a(19) 3001:4000

0.0 0.4 0.8

0 50 100 150 a(19) 4001:5000

0.6 1.0 1.4

0 50 100 150 200

a(25)

a(25) 1:1000

0.6 1.0 1.4

0 50 100 150 a(25) 1001:2000

0.6 1.0 1.4

0 50 100 150 a(25) 2001:3000

0.6 1.0 1.4

0 50 100 150 a(25) 3001:4000

0.6 1.0 1.4

0 50 100 150 200 a(25) 4001:5000

0.0 0.4 0.8

0 50 100 150 200

a(35)

a(35) 1:1000

0.0 0.4 0.8

0 50 100 150 a(35) 1001:2000

0.0 0.4 0.8

0 50 100 150 a(35) 2001:3000

0.0 0.4 0.8

0 50 100 150 200 a(35) 3001:4000

0.0 0.4 0.8

0 50 100 150 200 250 a(35) 4001:5000