Pn054 Channel One - Estimated Error

Time

0 50 100 150

-0.03 -0.02 -0.01 0.0 0.01 0.02

Pn054 Channel Two - Estimated Error

Time

0 50 100 150

-0.02 0.0 0.02

Pn054 Channel Three - Estimated Error

Time

0 50 100 150

-0.04 -0.02 0.0 0.02

Pn054 Channel Four - Estimated Error

Time

0 50 100 150

-0.04 0.0 0.02 0.04 0.06

Pn054 Channel Five - Estimated Error

Time

0 50 100 150

-0.02 0.0 0.01 0.02 0.03