Explosion a054

Time

0 1000 2000 3000 4000

-1000 -500 0 500

Pn Pg Sn

Lg

Pre-Explosion a054

Time

0 200 400 600 800 1000

-10 -5 0 5 10

Pn phase of a054

Time

0 50 100 150 200 250

-100 0 100 200

Pn

Lg phase of a054

Time

0 100 200 300 400 500

-1000 -500 0 500

Lg